68 p53 binding sites (Funk data) bits

5′TAGAG C GA C CTGATGC A GACT GCTA CGAT ACTGGTAC GTCA CA G A G G A C AT GC T T C GT C CAGT CATGTGAC GCTA CGAT TCGA AGC T GACT TC G TG C TAC 3′